                 Multifunctional CardTerminals

                                                                                                                       MCT

for

                                                                                                      Health Care

and

                                                                                          other Application Areas

                                                                                        Specification Version 0.9

                                                                                                                August 1995

Editors

                                                                "Joint German Panel in Health Care"

GMD - German National Research Center for Information Technology

Contents

Part 1: MCT - Basic concept

Part 2: CT-ICC-Interface

                                                 Multifunctional CardTerminal Interface for contact orientated ICCs with

                                                 synchronous and asynchronous transmission

Part 3: CT-API 1.1

                                                 Application independent C ard T erminal A pplication P rogramming

                                                 I nterface for ICC applications

Part 4: CT-BCS

                                                 Application independent C ard T erminal B asic C ommand S et for ICC

                                                 applications

Part 5: IC cards with synchronous transmission

                                                 Part 1: ATR and data sections

Part 6: IC cards with synchronous transmission

                                                 Part 2: Transmission protocols

Part 7: IC cards with synchronous transmission

                                                 Part 3: Usage of inter-industry commands

Part 8: Host-CT-Interface

                                                 for MCTs with V.24/V.28 connection

This specification is a translation of the German specification

~Multifunktionale KartenTerminals MKT für das Gesundheitswesen und andere

Anwendungsgebiete~

This specification was managed by

Working Group "Multifunctional CardTerminals (MCT)" of the

"Joint German Panel in Health Care"

(Chairman of the MCT-WG: Bruno Struif, GMD)

Contributions:

Deutsche Telekom AG / PZ Telesec

DIN-Ausschuß NI-17.4

Dr. Peter Debold, Projektbüro Versichertenkarte GmbH

GMD - Forschungszentrum Informationstechnik GmbH

RWTÜV  Anlagentechnik GmbH

TeleTrusT  Deutschland e.V.

Zentralinstitut für die Kassenärztliche Versorgung

Supply source:

Projektbüro Versichertenkarte Dr. P. Debold GmbH

Alte Holstenstr. 46

D-21031 Hamburg

Germany

Telefon 040 / 724 20 27

Fax        040 / 724 94 88

Please send comments to this specification to:

Dipl. Ing. Bruno Struif

GMD - Forschungszentrum Informationstechnik GmbH

Rheinstraße 75

D-64295 Darmstadt

Germany

Telefon 06151 / 869 206

Fax 06151 / 869 224

Address of the "Joint German Panel in Health Care"

Zentralinstitut für die Kassenärztliche Versorgung

Dipl. Inf. Jürgen Sembritzki

Ottostraße 1

D-50859 Köln

Germany

Telefon 02234 / 4094-262

Fax 02234 / 4979-79